; CommModifyKit.def - DLL 模块定义文件
; 项目名 CommModifyKit，输出文件名 CommModifyKit.dll（统一命名）
;
; 关键：__stdcall 通常被 MSVC 修饰为 _Func@N
; 使用 EXPORTS 段 + extern "C" 才能得到无修饰的导出名
; 这样 CommModifyService 的 GetProcAddress(...,"InitMonitor") 等可正确解析
LIBRARY CommModifyKit
EXPORTS
    InitMonitor       @1
    Monitor           @2
    Stop              @3
    SetWrite_Data     @4
    SetRead_Data      @5
    FreeMonitor       @6
    get_LastErrror    @7   ; 注意 3 个 r，与原拼写一致
